
                             Step 5: Install 

-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-

Make sure you type your CD-ROM mount point into the "CD-ROM
Information" section. Then click the "install" button. Installation
progress will be displayed in the "Installation Log" scrolled text
area.

Click on the Start Installation button to install EnlightenDSM in the
configuration(s) you specified in the previous four steps.

The Installation progress information is written to /tmp/install.log
and to the Installation Log scrolled text field. Clicking on the Clear
Log button will only clear the scrolled text field; this will not erase
any entries in the /tmp/install.log file.

Once the installation is complete, you can click on the Close button to
exit the EnlightenDSM Network Installer interface. Then you can continue
with the next section to start the EnlightenDSM GUI.

-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-=-
(c) 1996 - 1998 Enlighten Software Solutions, Inc.
